en	Image Gallery Slideshow

en	Display images as an interactive slideshow

en	Slideshow Options

en	Transition Type

en	Slide

en	Fade

en	Loop (endless)

en	Autoplay

en	Autoplay Interval (ms)

en	Time between slides in milliseconds (1000–20000)

en	Transition Speed (ms)

en	Duration of the slide transition in milliseconds

en	Show Navigation Arrows

en	Display navigation in the image

en	Position navigation absolutely in the bottom-right corner of the image

en	Show Captions

en	Display image title and description below each slide

en	Image Gallery Slideshow

en	No images added yet