en	Setup

en	Site

en	Site identifier

en	No root pages available

en	Please create at least one root page in the Layout module. A root page must be a content page at the top level (not a folder or separator) or have the "Root Page" flag enabled (Page Properties → Behavior tab).

en	Open the documentation

en	This site does not have a configuration, yet.

en	Add new site configuration for this site

en	Edit site configuration

en	Edit site settings

en	This site provides no configurable settings

en	Delete site configuration

en	Base URL

en	Pages without a site configuration

en	The following root pages have no site configuration:

en	Unassigned site configurations

en	The following site configurations don't belong to any page anymore and can be removed.

en	Invalid site set configurations

en	The following site sets contain errors and therefore could not be loaded.

en	Set

en	Error

en	Duplicated Entrypoints

en	The following entry points are used more than once:

en	Duplicated root pages

en	The page with ID "%1s" is used in the following site configurations:

en	View details

en	Entry Point

en	Error handling

en	Status

en	The installation includes <strong>%s configured sites</strong>.

en	The installation includes <strong>%s configured site</strong>.

en	<strong>%s root pages</strong> are lacking a site configuration.

en	<strong>%s page</strong> is lacking a site configuration.

en	There are currently <strong>%s site configurations</strong> that are not assigned to any page.

en	There is currently <strong>%s site configuration</strong> that is not assigned to any page.

en	Languages

en	and %s more

en	Sites

en	Dependencies to site sets

en	Yes

en	Static routes

en	No configured sites available

en	At least one root page must have a site configuration.

en	None

en	Setup of "%s"

en	Setup of site "%s"

en	Not configured.

en	Error handling

en	Site configuration

en	Languages

en	Language

en	Full URL prefix

en	Static routes

en	Route enhancers

en	Active settings

en	Settings within site configuration (e.g. via 'settings.yaml')

en	Dependencies

en	Settings can be stored directly via the site configuration, or indirectly by loading them as a dependency of another site set.<br>The following dependencies are stored in the site configuration:

en	Site settings

en	Settings are listed here as soon as they are either present in a <code>settings.yaml</code> file in the site folder or there is one or more dependencies on site sets in the site configuration.

en	No site settings were found for this site

en	Edit site settings

en	Edit site configuration

en	Renamed identifier

en	Given site identifier "%1s" already exists. It has been renamed to "%2s". Maybe you want to edit the site again and give it a better name.

en	Identifier not changed

en	Given site identifier "%1s" already exists and points to a different site. The existing identifier "%2s" for this site is kept.

en	Site configuration not saved

en	Field "%1s" is a required field, but no value has been provided.

en	Duplicate error code removed

en	Two error handler configurations for error code "%1s" found. This would be an invalid configuration, the dangling one has been removed.

en	Duplicate language configuration removed

en	Two language configurations for language "%1s" found. This would be an invalid configuration, the dangling one has been removed.

en	View Site Configuration "%s"

en	Edit Site Configuration "%s"

en	Edit Site Settings

en	Edit Site