en	The "%1$s" field is required to resolve links for pages of type "%2$s". Please provide a value in the page properties.

en	Invalid link in "%1$s": "%2$s" cannot be resolved. Select a valid destination in the page properties.

en	Page of type "%1$s" links to the following %2$s: %3$s.

en	Page of type "%1$s" links to current request url, and dynamic value cannot be displayed here.

en	Page of type "%1$s" appends %2$s to current request url, and dynamic value cannot be displayed here.

en	Page of type "%1$s" links to the following record of type "%2$s": %3$s.

en	Additional parameters: "%s".

en	Page of type "%1$s" links to content element %2$s on page %3$s.